import type { NextPage } from 'next';

import { UTILITY_CONSTANTS } from '@/constants/utilityConstants';

import ErrorPage from '@/components/common/errorpage/ErrorPage';

const ServerErrorPage: NextPage = () => {
    return (
        <>
            <ErrorPage errorType='Error 500' title='Sorry, Currently facing Internal Server Error' details='The server encountered an internal error or misconfiguration and was unable to complete your request.' image={UTILITY_CONSTANTS.IMAGE.ERROR.ERROR_505} />
        </>
    );
};

export default ServerErrorPage;
