-- vitalSign-pain Form in VITAL SIGNS Tab

UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"vitalSign-pain-template\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"ewpixrkl3ah9ix0c2ctmto\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"No Pain\",\"value\":\"No Pain\"},{\"index\":2,\"text\":\"Mild\",\"value\":\"Mild\"},{\"index\":3,\"text\":\"Moderate\",\"value\":\"Moderate\"},{\"index\":4,\"text\":\"Severe\",\"value\":\"Severe\"},{\"index\":5,\"text\":\"Excruciation\",\"value\":\"Excruciation\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":6,\"inline\":\"true\",\"label\":\"Pain\",\"name\":\"vitalSign_pain\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"n6jo2tho1ah71aaf2q48j\",\"componentType\":\"select\",\"component\":{\"componentType\":\"select\",\"helper\":\"\",\"plugins\":[],\"selectOptions\":[{\"index\":1,\"text\":\"Patient denies any present or recent pain\",\"value\":\"Patient denies any present or recent pain\",\"groupname\":\"\"},{\"index\":2,\"text\":\"Pain Is currently present\",\"value\":\"Pain Is currently present\",\"groupname\":\"\"},{\"index\":3,\"text\":\"Pain exhibited less often than daily\",\"value\":\"Pain exhibited less often than daily\",\"groupname\":\"\"},{\"index\":4,\"text\":\"Pain exhibited daily, but does not Interfere with activity or movement\",\"value\":\"Pain exhibited daily, but does not Interfere with activity or movement\",\"groupname\":\"\"},{\"index\":5,\"text\":\"Daily pain Interferes with patient activity\",\"value\":\"Daily pain Interferes with patient activity\",\"groupname\":\"\"}],\"attr\":[],\"clazz\":\"\",\"index\":2,\"label\":\"If Patient Have Pain\",\"name\":\"if_patient_have_pain\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"8zqewuuj2va3nuir3mt6o8\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":1,\"label\":\"Pain Location\",\"name\":\"vitalsign_pain_location\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"z7ikq6ihb7pxch3s6ybiz9\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Intermittent\",\"value\":\"Intermittent\"},{\"index\":2,\"text\":\"Continuous\",\"value\":\"Continuous\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":7,\"inline\":\"true\",\"label\":\"Pain consistency\",\"name\":\"pain_consistency\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ez5jnzyz9ikq7ouli7iu\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Movement\",\"value\":\"Movement\"},{\"index\":2,\"text\":\"AOLs\",\"value\":\"AOLs\"},{\"index\":3,\"text\":\"Sleep\",\"value\":\"Sleep\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Pain Affects\",\"name\":\"pain_affects\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"4d1341yq6sx3qtdp4w31jw\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"No Non-Verbal S/S of pain\",\"value\":\"No Non-Verbal S/S of pain\"},{\"index\":2,\"text\":\"Non-Verbal S/S Present\",\"value\":\"Non-Verbal S/S Present\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":8,\"inline\":\"true\",\"label\":\"For Non-Verbal Patient\",\"name\":\"for_non_verbal_patient\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ruvkf048diyywu0uhqfxs\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":4,\"label\":\"Pain Medications/Treatments Used\",\"name\":\"pain_medications_treatments_used\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"27toj3uw0pthxm59hnmwe\",\"componentType\":\"select\",\"component\":{\"componentType\":\"select\",\"helper\":\"\",\"plugins\":[],\"selectOptions\":[{\"index\":1,\"text\":\"Effective\",\"value\":\"Effective\",\"groupname\":\"\"},{\"index\":2,\"text\":\"Moderate Relief/or pain level is acceptable to patient\",\"value\":\"Moderate Relief/or pain level is acceptable to patient\",\"groupname\":\"\"},{\"index\":3,\"text\":\"Effective when followed, but not always followed as directed/prescribed\",\"value\":\"Effective when followed, but not always followed as directed/prescribed\",\"groupname\":\"\"},{\"index\":4,\"text\":\"Pain regimen followed but control not adequate, MD notified\",\"value\":\"Pain regimen followed but control not adequate, MD notified\",\"groupname\":\"\"},{\"index\":5,\"text\":\"No pain control\",\"value\":\"No pain control\",\"groupname\":\"\"}],\"attr\":[],\"clazz\":\"\",\"index\":3,\"label\":\"Pain Control\",\"name\":\"pain_control\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ia7dxhatteboed81rvqlii\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":5,\"label\":\"If No Pain Control, Why?\",\"name\":\"if_no_pain_control\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"i2f4ankzr1hz92n4h0uwgr\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":2,\"label\":\"When Pain Started\",\"name\":\"vitalSign_When_Pain_Started\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"f74ikeag4lkypz4lm1awy\",\"componentType\":\"select\",\"component\":{\"componentType\":\"select\",\"helper\":\"\",\"plugins\":[],\"selectOptions\":[{\"index\":1,\"text\":\"Seconds\",\"value\":\"Seconds\",\"groupname\":\"\"},{\"index\":2,\"text\":\"Minutes\",\"value\":\"Minutes\",\"groupname\":\"\"},{\"index\":3,\"text\":\"Hours\",\"value\":\"Hours\",\"groupname\":\"\"},{\"index\":4,\"text\":\"Days\",\"value\":\"Days\",\"groupname\":\"\"},{\"index\":5,\"text\":\"Weeks\",\"value\":\"Weeks\",\"groupname\":\"\"}],\"attr\":[],\"clazz\":\"\",\"index\":1,\"label\":\"\",\"name\":\"When_Pain_Started_duration\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"1bg4rlkxjq8kaypjui4rrg\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Accute\",\"value\":\"Accute\"},{\"index\":2,\"text\":\"Constant\",\"value\":\"Constant\"},{\"index\":3,\"text\":\"Sporatic\",\"value\":\"Sporatic\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Type\",\"name\":\"vitalSign_Type\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ms35q79xhsqf6xt11dwcdi\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Aching\",\"value\":\"Aching\"},{\"index\":2,\"text\":\"Dull\",\"value\":\"Dull\"},{\"index\":3,\"text\":\"Sharp\",\"value\":\"Sharp\"},{\"index\":4,\"text\":\"Burning\",\"value\":\"Burning\"},{\"index\":5,\"text\":\"Throbbing\",\"value\":\"Throbbing\"}],\"attr\":[],\"clazz\":\"\",\"index\":3,\"inline\":\"true\",\"label\":\"Quality\",\"name\":\"vitalSign_Quality\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"cz29v4erz599qtiacs0ti\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Activity\",\"value\":\"Activity\"},{\"index\":2,\"text\":\"Rest\",\"value\":\"Rest\"},{\"index\":3,\"text\":\"Heat\",\"value\":\"Heat\"},{\"index\":4,\"text\":\"Cold\",\"value\":\"Cold\"},{\"index\":5,\"text\":\"Warm\",\"value\":\"Warm\"},{\"index\":6,\"text\":\"Medication\",\"value\":\"Medication\"},{\"index\":7,\"text\":\"Sound\",\"value\":\"Sound\"},{\"index\":8,\"text\":\"Other\",\"value\":\"Other\"}],\"attr\":[],\"clazz\":\"\",\"index\":4,\"inline\":\"true\",\"label\":\"Pain Precipitation Measures\",\"name\":\"vitalSign_Pain_Precipitation_Measures\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"danas4ytp24fiviczgxkhi\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Activity\",\"value\":\"Activity\"},{\"index\":2,\"text\":\"Rest\",\"value\":\"Rest\"},{\"index\":3,\"text\":\"Heat\",\"value\":\"Heat\"},{\"index\":4,\"text\":\"Cold\",\"value\":\"Cold\"},{\"index\":5,\"text\":\"Warm\",\"value\":\"Warm\"},{\"index\":6,\"text\":\"Medication\",\"value\":\"Medication\"},{\"index\":7,\"text\":\"Repositioning\",\"value\":\"Repositioning\"},{\"index\":8,\"text\":\"Sound\",\"value\":\"Sound\"},{\"index\":9,\"text\":\"Other\",\"value\":\"Other\"}],\"attr\":[],\"clazz\":\"\",\"index\":5,\"inline\":\"true\",\"label\":\"Pain Relief Measures\",\"name\":\"vitalSign_Pain_Relief_Measures\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"opzn8dnxgqokyyn2xtdeqs\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"Use Wong Baker Faces Pain Scale Measures from above\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":3,\"label\":\"Pain Level After Applying Relief Measure \",\"name\":\"Pain_Level_After_Applying_Relief_Measure\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"fg-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"fg-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 33;