--Home Safety Assessments Form in Home Safety Assessments Tab


INSERT INTO `forms` (`id`, `form_name`, `form_data`) VALUES (76, 'home-safety-environmental', '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safty-environmental\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"vs23gg81131s062up3bhn\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Rooms uncluttered to allow unobstructed mobility\",\"name\":\"rooms_uncluttered_to_allow_unobstructed_mobility\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"i87g5qeywch6y5px5375aa\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Pesticides and flammable liquids properly stored\",\"name\":\"pesticides_and_flammable_liquids_properly_stored\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"hphb12fu8pgevrimjghyn6\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Perfumes and flammable liquids properly stored\",\"name\":\"perfumes_and_flammable_liquids_properly_stored\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"3tf5eajjbqzkli871xcs3\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"Adequate lighting in house and hall ways\",\"name\":\"adequate_lighting_in_house_and_hall_ways\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"3j4w082huss8m17brcc72x\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[],\"clazz\":\"\",\"index\":5,\"inline\":\"true\",\"label\":\"Throw rugs secured with non-slip backing\",\"name\":\"throw_rugs_secured_with_non_slip_backing\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"p6544vsa4hf7aljvntlxq\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":6,\"inline\":\"true\",\"label\":\"Handrails present and secure near stairs\",\"name\":\"handrails_present_and_secure_near_stairs\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"pl3s30hsf6clszzty9g5b\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":7,\"inline\":\"true\",\"label\":\"Stairs unobstructed\",\"name\":\"stairs_unobstructed\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ot96kohk8pihr8pfz78n\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":8,\"inline\":\"true\",\"label\":\"Cabinets child proof... window guards present\",\"name\":\"cabinets_child_proof_window_guards_present\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safty-environmental\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}'),
(77, 'home-safety-bathroom', '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-bathroom\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"xyf3f6rjqdh8wrserije2q\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Skid resistant mats in risk areas\",\"name\":\"skid_resistant_mats_in_risk_areas\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"nxk5wjlik6glxe36tawf3h\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[],\"clazz\":\"\",\"index\":2,\"inline\":\"true\",\"label\":\"Grab bar tub bench available\",\"name\":\"grab_bar_tub_bench_available\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"2mov2r57bft1xjl6eiyea2\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Plumbing facilities adequate\",\"name\":\"plumbing_facilities_adequate\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"60ou8eiulcj6f1ykfrvhwx\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"Clients sensor capabilities regarding temperature adequate\",\"name\":\"clients_sensor_capabilities_regarding_temperature_adequate\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"8inw20qrzcxeuh2o0o681o\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[],\"clazz\":\"\",\"index\":5,\"inline\":\"true\",\"label\":\"Electric appliances away from tub/shower\",\"name\":\"electric_appliances_away_from_tub_shower\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-bathroom\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}'),
(78, 'home-safety-medications', '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-medications\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"n10f96zeihrkobwbv5sk7p\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Outdated medications discarded\",\"name\":\"outdated_medications_discarded\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"f3eg6s1d1aqyx3nn50bkvi\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Medications in safe and appropriate storage area\",\"name\":\"medications_in_safe_and_appropriate_storage_area\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-medications\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}'),
(79, 'home-safety-supplies', '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-supplies\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"n53lmmjlqaj25hpo4gq339\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Extension cords properly used\",\"name\":\"extension_cords_properly_used\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"la0a9rg2etfcu5u552gtf\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Oxygen/ventilators have special electrical assessment completed by DME vendor\",\"name\":\"oxygen_ventilators_have_special_electrical_assessment_completed_by_dme_vendor\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"nyfqs3ck5ezhlv3s0pwnc\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Electrical and telephone cords safely positioned and in good repair\",\"name\":\"electrical_and_telephone_cords_safely_positioned_and_in_good_repair\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"kko5pv3rjkl81xmsnb04gv\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"Medical equipment is appropriate and in good condition/client understands proper use\",\"name\":\"medical_equipment_is_appropriate_and_in_good_condition_client_understands_proper_use\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-supplies\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}'),
(80, 'home-safety-fire', '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-fire\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"yype8lf34dqmvq92fs9w3g\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Smoke detector present and working on each level of home\",\"name\":\"smoke_detector_present_and_working_on_each_level_of_home\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"0zqtxy3v0y4gbqvg8h4qro\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Knowledgeable in accessing emergency assistance (911)\",\"name\":\"knowledgeable_in_accessing_emergency_assistance\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"p82mr2w1xvcicgplsd0w6f\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Smoking safety followed\",\"name\":\"smoking_safety_followed\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"qfchyx3aqd2c5q7kz0mc2\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"No obstructions near stove/oven\",\"name\":\"no_obstructions_near_stove_oven\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"kne1ef8nu5czxo2hgeyxnl\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"N/A\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":5,\"inline\":\"true\",\"label\":\"Stove/oven in working order\",\"name\":\"stove_oven_in_working_order\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-fire\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}');




INSERT INTO `form_template_mapping` (`id`, `form_name`, `template_id`) VALUES (NULL, 'home-safety-environmental', '76');

INSERT INTO `form_template_mapping` (`id`, `form_name`, `template_id`) VALUES (NULL, 'home-safety-bathroom', '77');

INSERT INTO `form_template_mapping` (`id`, `form_name`, `template_id`) VALUES (NULL, 'home-safety-medications', '78');

INSERT INTO `form_template_mapping` (`id`, `form_name`, `template_id`) VALUES (NULL, 'home-safety-supplies', '79');

INSERT INTO `form_template_mapping` (`id`, `form_name`, `template_id`) VALUES (NULL, 'home-safety-fire', '80');

ALTER TABLE `patient_report` ADD `home_safety_assessments` TEXT NOT NULL AFTER `covid19screening`;