UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"hhc-poc-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"ohtk6lot1d8f6rco60lvgi\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":1,\"label\":\"Patient HI Claim No\",\"name\":\"patient_hi_claim_no\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"v6qh197izp9sdm0sq3bna8\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":2,\"label\":\"Start of Care Date\",\"name\":\"start_of_care_date\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"2pptmrkn0v5tt82uz3h61\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":3,\"label\":\"Certification Period Form\",\"name\":\"certification_period_form\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"13tkb7wt3ajiwpq2io73tjp\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":4,\"label\":\"TO\",\"name\":\"certification_period_to\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"7tny68wn01nbffk90t1v2\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":5,\"label\":\"Medical Record No\",\"name\":\"medical_record_no\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"qri7sw60iugl9ht7qahs5k\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":6,\"label\":\"Provider No\",\"name\":\"provider_no\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"7oh4iz2vqln2om5r4ts5i3\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":7,\"label\":\"ICD-10 Principal Diagnosis\",\"name\":\"icd10_principal_diagnosis\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"6ucta7pmnbc7rpixak2u6k\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":8,\"label\":\"Date\",\"name\":\"icd10_principal_diagnosis_date\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"j9u01kfawgjjahhxr3y4hg\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":9,\"label\":\"ICD-10 Surgical Procedure\",\"name\":\"icd10_surgical_procedure\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"boc6ym9s2zm79jrjlnlugq\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":10,\"label\":\"Date\",\"name\":\"icd10_surgical_procedure_date\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"lit2u0pd87lqsshcj8n0lm\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":11,\"label\":\"ICD-10 Other Pertinent Diagnoses\",\"name\":\"icd10_other_pertinent_diagnoses\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"2f5nfxio3cix3spqkpnacr\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":12,\"label\":\"Date\",\"name\":\"icd10_other_pertinent_diagnoses_date\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"bitlhkv421pyvzj5xkqzp\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":1,\"label\":\"Medications: Dose/Frequency/Route New Changed\",\"name\":\"medications_dose_frequency_route_new_changed\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"dbhkbcufeyjfdujvtbkniw\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":13,\"label\":\"DME and Supplies\",\"name\":\"dme_and_supplies\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"2l2jo4wxg3cxf739f8qgcs\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":14,\"label\":\"Safety Measures\",\"name\":\"safety_measures\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"asxrgm0o9539ad6oi2jiy\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":15,\"label\":\"Nutritional Req\",\"name\":\"nutritional_req\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"zsywupfrn9cns2msoux6b\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":16,\"label\":\"Allergies\",\"name\":\"allergies\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"rlugzj8uk99sz2cmmzb2jb\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Amputation\",\"value\":\"Amputation\"},{\"index\":2,\"text\":\"Bowel_Bladder\",\"value\":\"Bowel/Bladder{incontinence}\"},{\"index\":3,\"text\":\"Contracture\",\"value\":\"Contracture\"},{\"index\":4,\"text\":\"Hearing\",\"value\":\"Hearing\"},{\"index\":5,\"text\":\"Paralysis\",\"value\":\"Paralysis\"},{\"index\":6,\"text\":\"Endurance\",\"value\":\"Endurance\"},{\"index\":7,\"text\":\"Ambulation\",\"value\":\"Ambulation\"},{\"index\":8,\"text\":\"Speech\",\"value\":\"Speech\"},{\"index\":9,\"text\":\"Legally Blind\",\"value\":\"Legally Blind\"},{\"index\":10,\"text\":\"Dyspnea\",\"value\":\"Dyspnea\"},{\"index\":11,\"text\":\"Other\",\"value\":\"Other\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"A. Functional Limitations\",\"name\":\"functional_limitations\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"fwo71tjbctohfiebahm33\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":17,\"label\":\"Specify if Functional Limitations is Other\",\"name\":\"specify_if_functional_limitations_is_other\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"1trdbtztzukjsqh44qcq9s\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Complete Bed rest\",\"value\":\"Complete Bed rest\"},{\"index\":2,\"text\":\"Bed rest BRP\",\"value\":\"Bed rest BRP\"},{\"index\":3,\"text\":\"Up As Tolerated\",\"value\":\"Up As Tolerated\"},{\"index\":4,\"text\":\"Transfer Bed_Chair\",\"value\":\"Transfer Bed/Chair\"},{\"index\":5,\"text\":\"Excursuses Prescribed\",\"value\":\"Excursuses Prescribed \"},{\"index\":6,\"text\":\"Partial Weight Bearing\",\"value\":\"Partial Weight Bearing\"},{\"index\":7,\"text\":\"Independent At Home\",\"value\":\"Independent At Home\"},{\"index\":8,\"text\":\"Crutches\",\"value\":\"Crutches\"},{\"index\":9,\"text\":\"Cane\",\"value\":\"Cane\"},{\"index\":10,\"text\":\"Wheelchair\",\"value\":\"Wheelchair\"},{\"index\":11,\"text\":\"Walker\",\"value\":\"Walker\"},{\"index\":12,\"text\":\"No restrictions\",\"value\":\"No restrictions\"},{\"index\":13,\"text\":\"Other\",\"value\":\"Other\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"B. Activities Permitted\",\"name\":\"activities_permitted\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"qhe6ljz15pcv8nphd1qi\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":18,\"label\":\"Specify if Activities Permitted is Other\",\"name\":\"specify_if_activities_permitted_is_other\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"38wxdy51dvxmwcbpkynv5\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Oriented\",\"value\":\"Oriented\"},{\"index\":2,\"text\":\"Comatose\",\"value\":\"Comatose\"},{\"index\":3,\"text\":\"Forgetful\",\"value\":\"Forgetful\"},{\"index\":4,\"text\":\"Depressed\",\"value\":\"Depressed\"},{\"index\":5,\"text\":\"Disoriented\",\"value\":\"Disoriented\"},{\"index\":6,\"text\":\"Lethargic\",\"value\":\"Lethargic\"},{\"index\":7,\"text\":\"Agitated\",\"value\":\"Agitated\"},{\"index\":8,\"text\":\"Other\",\"value\":\"Other\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Mental Status\",\"name\":\"mental_status\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ubk9ggrc1fopekd12hhx4\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Poor\",\"value\":\"Poor\"},{\"index\":2,\"text\":\"Guarded\",\"value\":\"Guarded\"},{\"index\":3,\"text\":\"Fair\",\"value\":\"Fair\"},{\"index\":4,\"text\":\"Good\",\"value\":\"Good\"},{\"index\":5,\"text\":\"Excellent\",\"value\":\"Excellent\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Prognosis\",\"name\":\"prognosis\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"6374b8jr6wo67jkp8qmgiw\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":19,\"label\":\"RN every (x) 180 days for assessment\",\"name\":\"rn_every_180_days_for_assessment\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"f70c5ux90jrpusxvmbczls\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":20,\"label\":\"RN to supervise HHA every (x) and prn for incidentals\",\"name\":\"rn_to_supervise_hha_every_and_prn_for_incidentals\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"hsq55vwvcq737kdmhsd8x\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":21,\"label\":\"HHN/PCA to provide assistance with adlss and i adls (x) number of days\",\"name\":\"hhn_pca_to_provide_assistance_with_adlss_and_iadls_number_of_days\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"zw6xcx17bbpk2t074uo6z\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":22,\"label\":\"hours (x) 180 days\",\"name\":\"hours_180_days\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"eo4e3uf15z91g3l8visbn\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"}],\"attr\":[],\"clazz\":\"\",\"index\":2,\"inline\":\"true\",\"label\":\"Palative Care Needed\",\"name\":\"Palative Care Needed\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"qjxnr1inizysbfgf6vpkc\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":23,\"label\":\"TAL Level\",\"name\":\"tal_level\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"dgs6296mc6t6jsmah08iz\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":2,\"label\":\"Goals/Rehabilitation Potential/Discharge Plans\",\"name\":\"goals_rehabilitation_potential_discharge_plans\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"1y0ujdfju8vk3mx9gj18xk\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":24,\"label\":\"Nurse(s) Signature and Date of Verbal SOC Where Applicable\",\"name\":\"nurse_signature_and_date_of_verbal_soc_where_applicable\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"mzu5n0pvrajyhlvzgam87p\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":25,\"label\":\"Date HHA Received Signed POT\",\"name\":\"date_hha_received_signed_pot\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"opw7lz5q0lec2ljm1dkg4a\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":3,\"label\":\"Physician(s) Name and Address\",\"name\":\"physician_name_and_address\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"uogiju5gdke016bteh6cqc5e\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":26,\"label\":\"I certify this patient is confined to his/her home and needs intermittent skilled nursing care, physical therapy and/or speech therapy, or Continues to need occupational therapy. This patient is under my care, and I have authorized the services on this plan of care, and will periodically review the plan. I further certify this patient hade face-to-face encounter that was performed on xx/xx/xxxx by a physician or Medicare allowed non-physician practitioner that was related to the primary reason the patient requires home health services\",\"name\":\"i_certify_this_patient_is_confined\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"plvwx1twyqrekt1fuac9gg\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":4,\"label\":\"Attending Physician(s) Signature and Date Signed\",\"name\":\"attending_shysician_signature_and_date_signed\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"fg-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"fg-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 72;

UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safty-environmental\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"vs23gg81131s062up3bhn\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Rooms uncluttered to allow unobstructed mobility\",\"name\":\"rooms_uncluttered_to_allow_unobstructed_mobility\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"i87g5qeywch6y5px5375aa\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Pesticides and flammable liquids properly stored\",\"name\":\"pesticides_and_flammable_liquids_properly_stored\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"hphb12fu8pgevrimjghyn6\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Perfumes and flammable liquids properly stored\",\"name\":\"perfumes_and_flammable_liquids_properly_stored\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"3tf5eajjbqzkli871xcs3\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"Adequate lighting in house and hall ways\",\"name\":\"adequate_lighting_in_house_and_hall_ways\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"3j4w082huss8m17brcc72x\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[],\"clazz\":\"\",\"index\":5,\"inline\":\"true\",\"label\":\"Throw rugs secured with non-slip backing\",\"name\":\"throw_rugs_secured_with_non_slip_backing\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"p6544vsa4hf7aljvntlxq\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":6,\"inline\":\"true\",\"label\":\"Handrails present and secure near stairs\",\"name\":\"handrails_present_and_secure_near_stairs\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"pl3s30hsf6clszzty9g5b\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":7,\"inline\":\"true\",\"label\":\"Stairs unobstructed\",\"name\":\"stairs_unobstructed\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ot96kohk8pihr8pfz78n\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":8,\"inline\":\"true\",\"label\":\"Cabinets child proof... window guards present\",\"name\":\"cabinets_child_proof_window_guards_present\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safty-environmental\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 76;

UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-bathroom\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"xyf3f6rjqdh8wrserije2q\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Skid resistant mats in risk areas\",\"name\":\"skid_resistant_mats_in_risk_areas\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"nxk5wjlik6glxe36tawf3h\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[],\"clazz\":\"\",\"index\":2,\"inline\":\"true\",\"label\":\"Grab bar tub bench available\",\"name\":\"grab_bar_tub_bench_available\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"2mov2r57bft1xjl6eiyea2\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Plumbing facilities adequate\",\"name\":\"plumbing_facilities_adequate\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"60ou8eiulcj6f1ykfrvhwx\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"Clients sensor capabilities regarding temperature adequate\",\"name\":\"clients_sensor_capabilities_regarding_temperature_adequate\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"8inw20qrzcxeuh2o0o681o\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[],\"clazz\":\"\",\"index\":5,\"inline\":\"true\",\"label\":\"Electric appliances away from tub/shower\",\"name\":\"electric_appliances_away_from_tub_shower\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-bathroom\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 77;

UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-medications\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"n10f96zeihrkobwbv5sk7p\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Outdated medications discarded\",\"name\":\"outdated_medications_discarded\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"f3eg6s1d1aqyx3nn50bkvi\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Medications in safe and appropriate storage area\",\"name\":\"medications_in_safe_and_appropriate_storage_area\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-medications\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 78;

UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-supplies\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"n53lmmjlqaj25hpo4gq339\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Extension cords properly used\",\"name\":\"extension_cords_properly_used\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"la0a9rg2etfcu5u552gtf\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Oxygen/ventilators have special electrical assessment completed by DME vendor\",\"name\":\"oxygen_ventilators_have_special_electrical_assessment_completed_by_dme_vendor\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"nyfqs3ck5ezhlv3s0pwnc\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Electrical and telephone cords safely positioned and in good repair\",\"name\":\"electrical_and_telephone_cords_safely_positioned_and_in_good_repair\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"kko5pv3rjkl81xmsnb04gv\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"Medical equipment is appropriate and in good condition/client understands proper use\",\"name\":\"medical_equipment_is_appropriate_and_in_good_condition_client_understands_proper_use\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-supplies\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 79;

UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-fire\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"yype8lf34dqmvq92fs9w3g\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Smoke detector present and working on each level of home\",\"name\":\"smoke_detector_present_and_working_on_each_level_of_home\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"0zqtxy3v0y4gbqvg8h4qro\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Knowledgeable in accessing emergency assistance (911)\",\"name\":\"knowledgeable_in_accessing_emergency_assistance\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"p82mr2w1xvcicgplsd0w6f\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Smoking safety followed\",\"name\":\"smoking_safety_followed\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"qfchyx3aqd2c5q7kz0mc2\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"No obstructions near stove/oven\",\"name\":\"no_obstructions_near_stove_oven\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"kne1ef8nu5czxo2hgeyxnl\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"},{\"index\":3,\"text\":\"N/A\",\"value\":\"NA\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":5,\"inline\":\"true\",\"label\":\"Stove/oven in working order\",\"name\":\"stove_oven_in_working_order\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"home-safety-fire\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 80;

UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"medication-management\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"vkgp5zfys8qgkddjsz4v0o\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"no\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"Oral medications?\",\"name\":\"oral_medications\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"g6h5ck1c9wmtxn3nl211en\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":1,\"label\":\"If no, indicate who Is responsible\",\"name\":\"oral_medication_responsible\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"42dptzcrflggow4no34b8v\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"N/A\",\"value\":\"N/A\"},{\"index\":2,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":3,\"text\":\"No\",\"value\":\"No\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":2,\"inline\":\"true\",\"label\":\"Injection medications?\",\"name\":\"injection_medications\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"df97hhyps2qlhjwzcaa5g\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":3,\"inline\":\"true\",\"label\":\"Does Patient require medication pre-pour? \",\"name\":\"does_patient_require_medication_pre_pour\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"8uay7cb7r0a94z947q37if\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":2,\"label\":\"Who is responsible?\",\"name\":\"patient_require_medication_pre_pour_responsible\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"50%\"}},{\"id\":\"8rsgg4y0tvqxwzqsdlautr\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Takes meds as prescribed takes meds as prescribed\",\"value\":\"Takes meds as prescribed takes meds as prescribed\"},{\"index\":2,\"text\":\"Sometimes falls to comply\",\"value\":\"Sometimes falls to comply\"},{\"index\":3,\"text\":\"Non-compliant\",\"value\":\"Non-compliant\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":4,\"inline\":\"true\",\"label\":\"Medication compliance as reported by patient\",\"name\":\"medication_compliance_reported_patient\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"a20gf7g3x2sa0x70hwyri\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Patient Independently\",\"value\":\"Patient Independently\"},{\"index\":2,\"text\":\"Patient with reminders\",\"value\":\"Patient with reminders\"},{\"index\":3,\"text\":\"Family Member/Other\",\"value\":\"Family Member/Other\"}],\"attr\":[],\"clazz\":\"\",\"index\":5,\"inline\":\"true\",\"label\":\"Who Administers medications\",\"name\":\"who_administers_medications\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"e42o279jxei7jkp19mg3r7\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":3,\"label\":\"Administers Medications Name\",\"name\":\"who_administers_medications_name\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"kq1jnwueipqgydzdi0uxf\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":4,\"label\":\"Administers Medications Role\",\"name\":\"who_administers_medications_role\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ruq7aqekfihhenfl37k9\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":5,\"label\":\"Administers Medications Phone\",\"name\":\"who_administers_medications_phone\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"giyjyimgm30b3rjhoh0u0g\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":6,\"label\":\"RN will administer effective \",\"name\":\"rn_will_administer_effective \",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"49qfxiia36lfy9hd12dosm\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":7,\"label\":\"RN Name who will Prepour\",\"name\":\"rn_name_who_will_Prepour\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"x8rxgo90npkmbi5qb1ddu\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"}],\"attr\":[{\"name\":\"class\",\"value\":\"fstfdt6tsrt\"}],\"clazz\":\"fstfdt6tsrt\",\"index\":1,\"inline\":\"true\",\"label\":\"I have reviewed the medications to identity potential adverse effects and drug reactions including ineffective drug therapy, significant side effects, significant drug interactions and duplicate drug therapy\",\"name\":\"i_have_reviewed_the_medications_to_identity \",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"030y52msck5fq0xob7m1cm\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"}],\"attr\":[],\"clazz\":\"\",\"index\":2,\"inline\":\"true\",\"label\":\"Left White copy in office, yellow copy in home\",\"name\":\"left_white_copy_in_office\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"fg-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 69;