UPDATE `forms` SET `form_data` = '{\"formSections\":[{\"id\":\"user-form-settings\",\"componentType\":\"form\",\"component\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"narrative-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}},{\"id\":\"0s8l7buwrmap6so6f4p5j0p\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":1,\"label\":\"Visit end time\",\"name\":\"Narrative_visit_end_time\",\"placeholder\":\"\",\"type\":\"time\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"pioi9kmvczmfx324z9xc2a\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Not Needed\",\"value\":\"Not Needed\"},{\"index\":2,\"text\":\"Refused\",\"value\":\"Refused\"},{\"index\":3,\"text\":\"Provided\",\"value\":\"Provided\"}],\"attr\":[],\"clazz\":\"\",\"index\":1,\"inline\":\"true\",\"label\":\"Patient Assessed For Poliative Care\",\"name\":\"Patient_assessed_for_poliative_care\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"a3qmf9llfo6tijixegjhy\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"}],\"attr\":[],\"clazz\":\"\",\"index\":1,\"inline\":\"true\",\"label\":\"Patient is DNR\",\"name\":\"Patient_is_DNR\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"zn9pnmgbhgaca7st8d5t8\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"No problems Identified\",\"value\":\"No problems Identified\"},{\"index\":2,\"text\":\"Electrical Hazards\",\"value\":\"Electrical Hazards\"},{\"index\":3,\"text\":\"Food/Storage Preparation Issues\",\"value\":\"Food/Storage Preparation Issues\"},{\"index\":4,\"text\":\"High Crime Area\",\"value\":\"High Crime Area\"},{\"index\":5,\"text\":\"Inadequate cooling/Heating\",\"value\":\"Inadequate cooling/Heating\"},{\"index\":6,\"text\":\"Insect/Rodent Problems\",\"value\":\"Insect/Rodent Problems\"},{\"index\":7,\"text\":\"Structural Hazard\",\"value\":\"Structural Hazard\"},{\"index\":8,\"text\":\"Sewage Disposal Problems\",\"value\":\"Sewage Disposal Problems\"},{\"index\":9,\"text\":\"Stairs\",\"value\":\"Stairs\"},{\"index\":10,\"text\":\"Telephone Assessed Issues\",\"value\":\"Telephone Assessed Issues\"},{\"index\":11,\"text\":\"Water Supply Issues\",\"value\":\"Water Supply Issues\"},{\"index\":12,\"text\":\"Stairs\",\"value\":\"Stairs\"},{\"index\":13,\"text\":\"Telephone Assessed Issues\",\"value\":\"Telephone Assessed Issues\"}],\"attr\":[],\"clazz\":\"\",\"index\":2,\"inline\":\"true\",\"label\":\"Safety_Environment_Assessment\",\"name\":\"Safety Environment Assessment\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"v0wlf3gnm4n4w9edxjq6l\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":2,\"label\":\"Pneumococcal Vaccination\",\"name\":\"Pneumococcal Vaccination\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"8alck4vvmkeltzalxvf8ze\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":3,\"label\":\"Influenza vaccination\",\"name\":\"Influenza_vaccination\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"ef4x570eunpzskh54jio7\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"(Describe Issues and Intervention)\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":1,\"label\":\"Comments:\",\"name\":\"Comments_Describe_Issues_and_Intervention\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"4v6ycplv0ek1n7kowujann\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Aspiration Precaution\",\"value\":\"Aspiration Precaution\"},{\"index\":2,\"text\":\"Bleeding Precaution\",\"value\":\"Bleeding Precaution\"},{\"index\":3,\"text\":\"Clear Pathway\",\"value\":\"Clear Pathway\"},{\"index\":4,\"text\":\"Fall Precaution \",\"value\":\"Fall Precaution \"},{\"index\":5,\"text\":\"Infection Control Measure \",\"value\":\"Infection Control Measure \"},{\"index\":6,\"text\":\"Needle Precaution\",\"value\":\"Needle Precaution\"},{\"index\":7,\"text\":\"Oxygen Precaution\",\"value\":\"Oxygen Precaution\"},{\"index\":8,\"text\":\"Proper Labeling of Medication\",\"value\":\"Proper Labeling of Medication\"},{\"index\":9,\"text\":\"Proper Waste Disposal\",\"value\":\"Proper Waste Disposal\"},{\"index\":10,\"text\":\"Seizure Precation\",\"value\":\"Seizure Precation\"},{\"index\":11,\"text\":\"Skin Care\",\"value\":\"Skin Care\"},{\"index\":12,\"text\":\"Standrad Precaution\",\"value\":\"Standrad Precaution\"}],\"attr\":[],\"clazz\":\"\",\"index\":3,\"inline\":\"true\",\"label\":\"Safty precatuion \",\"name\":\"Safety_precautions\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"42aq563omssluullsf00ol\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":2,\"label\":\"Narrative\",\"name\":\"Narrative\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"atwiiojl92me19z324frjn\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":3,\"label\":\"Plan\",\"name\":\"Plan\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"gup202tr5alw1s7ubs8ql\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":4,\"label\":\"Goals\",\"name\":\"Goals\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"fby4pu8301vllfftlvsjr\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":5,\"label\":\"Coordination\",\"name\":\"Coordination\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"2mrn48wmtk72wu05ogf1r\",\"componentType\":\"checkbox\",\"component\":{\"componentType\":\"checkbox\",\"helper\":\"\",\"plugins\":[],\"checkboxes\":[{\"index\":1,\"text\":\"Poor\",\"value\":\"Poor\"},{\"index\":2,\"text\":\"Guarded\",\"value\":\"Guarded\"},{\"index\":3,\"text\":\"Fair\",\"value\":\"Fair\"},{\"index\":4,\"text\":\"Good excellent\",\"value\":\"Good excellent\"}],\"attr\":[],\"clazz\":\"\",\"index\":4,\"inline\":\"true\",\"label\":\"Prognosis\",\"name\":\"Prognosis\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"fcoadq7lxpv424cha1fy68\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"}],\"attr\":[],\"clazz\":\"\",\"index\":2,\"inline\":\"true\",\"label\":\"Physician notification\",\"name\":\"Physician_notification\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"zuk87nfisr6atvhymnog\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":4,\"label\":\"Next MD Visit\",\"name\":\"Next_md_visit\",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"mgp5i2cvffa9ouwta793lk\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":5,\"label\":\"Planned Nursing Frequency\",\"name\":\"Planned_Nursing_Frequency\",\"placeholder\":\"\",\"type\":\"text\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"gwyvelo4wxadqjqnfd2ug\",\"componentType\":\"input\",\"component\":{\"componentType\":\"input\",\"helper\":\"\",\"icon\":\"\",\"iconPosition\":\"before\",\"plugins\":[],\"attr\":[],\"clazz\":\"\",\"index\":6,\"label\":\"Next Visit \",\"name\":\"Next_Visit \",\"placeholder\":\"\",\"type\":\"date\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"bxkxot9m0u85tlbrrxw0z\",\"componentType\":\"radio\",\"component\":{\"componentType\":\"radio\",\"helper\":\"\",\"plugins\":[],\"radioButtons\":[{\"index\":1,\"text\":\"Yes\",\"value\":\"Yes\"},{\"index\":2,\"text\":\"No\",\"value\":\"No\"}],\"attr\":[],\"clazz\":\"\",\"index\":3,\"inline\":\"true\",\"label\":\"Teaching provided\",\"name\":\"Teaching_provided\",\"value\":\"\",\"width\":\"100%\"}},{\"id\":\"2ou9v643a8iv4ijt4jn6mi\",\"componentType\":\"textarea\",\"component\":{\"componentType\":\"textarea\",\"helper\":\"\",\"plugins\":[],\"attr\":[{\"name\":\"class\",\"value\":\"narrative_comments\"}],\"clazz\":\"narrative_comments\",\"index\":6,\"label\":\"Comments\",\"name\":\"Comments\",\"placeholder\":\"\",\"value\":\"\",\"width\":\"100%\"}}],\"uiForm\":{\"attr\":\"novalidate\",\"id\":\"fg-form\",\"layout\":\"horizontal\"},\"userForm\":{\"ajax\":\"false\",\"attr\":\"novalidate\",\"framework\":\"bs4\",\"iconFont\":\"fontawesome5\",\"iconFontUrl\":\"//cdnjs.cloudflare.com/ajax/libs/font-awesome/5.3.1/css/all.min.css\",\"id\":\"fg-form\",\"layout\":\"horizontal\",\"plugins\":[],\"aftervalidation\":\"\",\"redirectUrl\":\"\",\"senderEmail\":\"\",\"recipientEmail\":\"\",\"subject\":\"\",\"senderName\":\"\",\"replyToEmail\":\"\",\"sentMessage\":\"\",\"dbTable\":\"\",\"dbPrimary\":\"\",\"dbFilter\":\"\"}}' WHERE `forms`.`id` = 47;